;
; Definition file of libwebp-7.dll
; Automatic generated by gendef 1.1
; written by Kai Tietz 2008
; The def file has to be processed by --kill-at (-k) option of dlltool or ld
;
LIBRARY "libwebp-7.dll"
EXPORTS
VP8CheckSignature
VP8GetCPUInfo DATA
VP8GetInfo
VP8LCheckSignature
VP8LGetInfo
WebPBlendAlpha
WebPCleanupTransparentArea
WebPConfigInitInternal
WebPConfigLosslessPreset
WebPCopyPixels
WebPCopyPlane
WebPDecode
WebPDecodeARGB
WebPDecodeARGBInto
WebPDecodeBGR
WebPDecodeBGRA
WebPDecodeBGRAInto
WebPDecodeBGRInto
WebPDecodeRGB
WebPDecodeRGBA
WebPDecodeRGBAInto
WebPDecodeRGBInto
WebPDecodeYUV
WebPDecodeYUVInto
WebPEncode
WebPEncodeBGR
WebPEncodeBGRA
WebPEncodeLosslessBGR
WebPEncodeLosslessBGRA
WebPEncodeLosslessRGB
WebPEncodeLosslessRGBA
WebPEncodeRGB
WebPEncodeRGBA
WebPFree
WebPFreeDecBuffer
WebPGetColorPalette
WebPGetDecoderVersion
WebPGetEncoderVersion
WebPGetFeaturesInternal
WebPGetInfo
WebPGetWorkerInterface
WebPIAppend
WebPIDecGetRGB
WebPIDecGetYUVA
WebPIDecode
WebPIDecodedArea
WebPIDelete
WebPINewDecoder
WebPINewRGB
WebPINewYUV
WebPINewYUVA
WebPIUpdate
WebPInitDecBufferInternal
WebPInitDecoderConfigInternal
WebPMalloc
WebPMemoryWrite
WebPMemoryWriterClear
WebPMemoryWriterInit
WebPPictureARGBToYUVA
WebPPictureARGBToYUVADithered
WebPPictureAlloc
WebPPictureCopy
WebPPictureCrop
WebPPictureDistortion
WebPPictureFree
WebPPictureHasTransparency
WebPPictureImportBGR
WebPPictureImportBGRA
WebPPictureImportBGRX
WebPPictureImportRGB
WebPPictureImportRGBA
WebPPictureImportRGBX
WebPPictureInitInternal
WebPPictureIsView
WebPPictureRescale
WebPPictureSharpARGBToYUVA
WebPPictureSmartARGBToYUVA
WebPPictureView
WebPPictureYUVAToARGB
WebPPlaneDistortion
WebPSafeCalloc
WebPSafeFree
WebPSafeMalloc
WebPSetWorkerInterface
WebPValidateConfig
