;
; Definition file of libimagequant.dll
; Automatic generated by gendef 1.1
; written by Kai Tietz 2008
; The def file has to be processed by --kill-at (-k) option of dlltool or ld
;
LIBRARY "libimagequant.dll"
EXPORTS
box_error
get_default_free_func
liq_attr_copy
liq_attr_create
liq_attr_create_with_allocator
liq_attr_destroy
liq_crash_if_invalid_handle_pointer_given
liq_crash_if_invalid_pointer_given
liq_executing_user_callback
liq_get_max_colors
liq_get_max_quality
liq_get_min_opacity
liq_get_min_posterization
liq_get_min_quality
liq_get_output_gamma
liq_get_palette
liq_get_quantization_error
liq_get_quantization_quality
liq_get_speed
liq_image_add_fixed_color
liq_image_create_custom
liq_image_create_rgba
liq_image_create_rgba_rows
liq_image_destroy
liq_image_get_height
liq_image_get_width
liq_image_quantize
liq_image_set_memory_ownership
liq_quantize_image
liq_result_destroy
liq_set_dithering_level
liq_set_last_index_transparent
liq_set_log_callback
liq_set_log_flush_callback
liq_set_max_colors
liq_set_min_opacity
liq_set_min_posterization
liq_set_output_gamma
liq_set_quality
liq_set_speed
liq_version
liq_write_remapped_image
liq_write_remapped_image_rows
