;
; Definition file of libffi-8.dll
; Automatic generated by gendef 1.1
; written by Kai Tietz 2008
; The def file has to be processed by --kill-at (-k) option of dlltool or ld
;
LIBRARY "libffi-8.dll"
EXPORTS
ffi_call
ffi_call_go
ffi_call_win64
ffi_closure_alloc
ffi_closure_free
ffi_closure_win64
ffi_closure_win64_inner
ffi_data_to_code_pointer
ffi_get_struct_offsets
ffi_go_closure_win64
ffi_java_ptrarray_to_raw
ffi_java_raw_call
ffi_java_raw_size
ffi_java_raw_to_ptrarray
ffi_prep_cif
ffi_prep_cif_core
ffi_prep_cif_machdep
ffi_prep_cif_var
ffi_prep_closure
ffi_prep_closure_loc
ffi_prep_go_closure
ffi_prep_java_raw_closure
ffi_prep_java_raw_closure_loc
ffi_prep_raw_closure
ffi_prep_raw_closure_loc
ffi_ptrarray_to_raw
ffi_raw_call
ffi_raw_size
ffi_raw_to_ptrarray
ffi_tramp_alloc
ffi_tramp_free
ffi_tramp_get_addr
ffi_tramp_is_present
ffi_tramp_is_supported
ffi_tramp_set_parms
ffi_type_complex_double DATA
ffi_type_complex_float DATA
ffi_type_complex_longdouble DATA
ffi_type_double DATA
ffi_type_float DATA
ffi_type_longdouble DATA
ffi_type_pointer DATA
ffi_type_sint16 DATA
ffi_type_sint32 DATA
ffi_type_sint64 DATA
ffi_type_sint8 DATA
ffi_type_uint16 DATA
ffi_type_uint32 DATA
ffi_type_uint64 DATA
ffi_type_uint8 DATA
ffi_type_void DATA
