ALTER TABLE `fd_fusion`.`t_scene_down_log`
ADD COLUMN `type` varchar(255) NULL DEFAULT 'scene' AFTER `update_time`;

ALTER TABLE `fd_fusion`.`t_case_files`
    ADD COLUMN `num` varchar(255) NULL AFTER `tabulation_id`;