/*
 Navicat Premium Data Transfer

 Source Server         : 127.0.0.1_3306
 Source Server Type    : MySQL
 Source Server Version : 50736
 Source Host           : 127.0.0.1:3306
 Source Schema         : fd_laser

 Target Server Type    : MySQL
 Target Server Version : 50736
 File Encoding         : 65001

 Date: 25/02/2025 11:17:13
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for t_scene
-- ----------------------------
DROP TABLE IF EXISTS `t_scene`;
CREATE TABLE `t_scene`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `create_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT '' COMMENT '创建者',
  `create_time` datetime NULL DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT '' COMMENT '更新者',
  `update_time` datetime NULL DEFAULT NULL COMMENT '更新时间',
  `remark` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '备注',
  `deleted` varchar(2) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT '0' COMMENT '逻辑未删除值0，逻辑已删除值1',
  `scene_code` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '场景码',
  `path` varchar(150) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '文件基础路径',
  `status` int(11) NULL DEFAULT 0 COMMENT '状态, -1:场景被删；0:计算中；1:计算失败；2:计算成功；3：封存（目前未使用此状态)；4：重算中',
  `recount` int(11) NULL DEFAULT NULL COMMENT '重算次数',
  `title` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '标题',
  `child_name` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL,
  `sn_code` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT 'sn码',
  `shoot_time` datetime NULL DEFAULT NULL COMMENT '拍摄时间',
  `web_site` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '展示链接',
  `user_Id` int(11) NULL DEFAULT NULL COMMENT '用户id',
  `user_name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '(用户名)手机号',
  `init_pic` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '封面图地址',
  `password` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT '' COMMENT '访问密码',
  `is_open` int(11) NULL DEFAULT 1 COMMENT '是否公开，默认公开',
  `disable_floor_pan` int(11) NULL DEFAULT 1 COMMENT '是否要禁止显示平面图 默认false',
  `floor_pan_type` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT 'default' COMMENT '平面图类型,默认default',
  `las_url` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '默认las文件地址',
  `show_mode` int(11) NULL DEFAULT 0 COMMENT '0表示全景图 1表示点云',
  `view_count` int(11) NULL DEFAULT 0 COMMENT '浏览次数',
  `cooperation_user_id` int(11) NULL DEFAULT 0 COMMENT '协作人id',
  `cooperation_user_name` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '协作人手机号',
  `dataset_id` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '数据集ID',
  `upload_count` int(11) NULL DEFAULT 0 COMMENT '上传次数',
  `ply_url` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '默认ply文件地址',
  `unicode` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT 'unicode',
  `obj_url` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '默认obj文件地址',
  `build_obj_status` int(11) NULL DEFAULT 0 COMMENT '生成OBJ状态,0，未生成 1完成，2计算中',
  `delete_flag` datetime NULL DEFAULT NULL COMMENT '逻辑删除',
  `is_copy` int(11) NULL DEFAULT 0 COMMENT '是否复制，默认否',
  `copy_time` datetime NULL DEFAULT NULL COMMENT '复制时间',
  `scene_version` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '场景版本',
  `offline_ver` int(11) NULL DEFAULT NULL COMMENT '离线包版本，和重算次数对比',
  `offline_url` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '离线包地址',
  `offline_status` int(11) NULL DEFAULT 1 COMMENT '离线包状态是否需要重新生成 1 不需要 2需要',
  `offline_lang` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT '' COMMENT '语言版本',
  `scene_source` int(11) NULL DEFAULT 4 COMMENT '场景来源：相机拍摄10以内表示，1表示八目，2双目，3转台，4 激光 5深光  其他来源10以上，11：一键换装，12：123看房，13文通虚拟场景',
  `algorithm_time` datetime NULL DEFAULT CURRENT_TIMESTAMP COMMENT '计算完成时间',
  `location` int(11) NULL DEFAULT 4 COMMENT '判断是否为slam场景,深光和深时 以前的场景都是4',
  `shoot_count` int(11) NULL DEFAULT 0 COMMENT '拍摄点位数量',
  `space` bigint(20) NULL DEFAULT 0 COMMENT '使用容量',
  `offline_ver_for_push` int(11) NULL DEFAULT 0 COMMENT '离线包版本-提供自动推送',
  `mixture` int(11) NULL DEFAULT 0,
  `pay_status` int(11) NULL DEFAULT 1,
  `build_e57_status` int(11) NULL DEFAULT 0 COMMENT '生成e57状态,-1 失败 0，未生成 1完成，2计算中',
  `mapping` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT 'profile' COMMENT '映射路径',
  `web_path` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '本地资源路径',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 266 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_unicode_ci COMMENT = '初始化信息表' ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of t_scene
-- ----------------------------
INSERT INTO `t_scene` VALUES (234, '', '2024-06-27 15:44:33', '', '2024-06-27 15:47:39', NULL, '0', '1806232129982173184', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\bpvt00013_202312071552151270\\web_laserData\\laserData', 2, 1, '项目1207.15.52', 'bpvt00013', 'bpvt00013', '2023-12-07 15:52:15', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 2, 0, NULL, '1806232129982173185', 0, NULL, 'bpvt00013_202312071552151270', NULL, 0, '2024-12-10 16:37:49', 0, NULL, 'V4', NULL, NULL, 1, '', 5, '2024-06-27 15:47:39', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (235, '', '2024-06-27 15:44:35', '', '2024-12-10 17:09:28', NULL, '0', '1806232138601467904', NULL, 3, NULL, '深时1－3多楼层', 'a0ia7r137', 'a0ia7r137', '2024-04-01 11:45:19', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806232138601467905', 0, NULL, 'a0ia7r137_202404011128343370', NULL, 0, '2024-12-10 17:09:27', 0, NULL, NULL, NULL, NULL, 1, '', 4, '2024-06-27 15:44:34', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (236, '', '2024-06-27 15:44:36', '', '2024-12-10 16:37:50', NULL, '0', '1806232145928916992', NULL, 3, NULL, '生成obj', 'bpvt00013', 'bpvt00013', '2023-12-07 15:51:51', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806232145928916993', 0, NULL, 'bpvt00013_202312071541572720', NULL, 0, '2024-12-10 16:37:50', 0, NULL, NULL, NULL, NULL, 1, '', 5, '2024-06-27 15:44:36', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (237, '', '2024-06-27 15:44:50', '', '2024-12-10 16:37:42', NULL, '0', '1806232201725743104', NULL, 3, NULL, '纯slam', 'bpvt00013', 'bpvt00013', '2023-12-04 18:31:01', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806232201725743105', 0, NULL, 'bpvt00013_202312041829174250', NULL, 0, '2024-12-10 16:37:41', 0, NULL, NULL, NULL, NULL, 1, '', 5, '2024-06-27 15:44:49', 6, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (238, '', '2024-06-27 15:46:33', '', '2024-12-12 20:14:41', NULL, '0', '1806232635865567232', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\902ce60f5_202406071059248740', 2, NULL, '视频计算中', '902ce60f5', '902ce60f5', '2024-06-07 11:12:44', 'datav1', NULL, NULL, 'scene_edit_data/1806232635865567232/user/thumb-1k.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806232635865567233', 0, NULL, '902ce60f5_202406071059248740', NULL, 0, NULL, 0, NULL, 'V4', NULL, NULL, 1, '', 3, '2024-10-08 17:37:20', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (239, '', '2024-06-27 15:52:02', '', '2024-06-27 15:57:20', NULL, '0', '1806234013866397696', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\bpvt00019_202406271041114670\\web_laserData\\laserData', 2, 1, '单楼层切换波浪点继续', 'bpvt00019', 'bpvt00019', '2024-06-27 11:16:26', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 11, 0, NULL, '1806234013866397697', 0, NULL, 'bpvt00019_202406271041114670', NULL, 1, '2024-12-10 16:37:48', 0, NULL, 'V4', NULL, NULL, 1, '', 5, '2024-06-27 15:57:56', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (240, '', '2024-06-27 15:52:22', '', '2024-12-10 16:37:50', NULL, '0', '1806234096741650432', NULL, 3, NULL, '重复拍摄', 'bpvt00019', 'bpvt00019', '2024-06-27 11:14:37', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806234096741650433', 0, NULL, 'bpvt00019_202406271110038300', NULL, 0, '2024-12-10 16:37:49', 0, NULL, NULL, NULL, NULL, 1, '', 5, '2024-06-27 15:52:21', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (241, '', '2024-06-27 15:57:07', '', '2024-12-10 17:09:28', NULL, '0', '1806235295855415296', NULL, 3, NULL, '2023.9.7obj', 'a0ia7r137', 'a0ia7r137', '2023-09-07 10:57:14', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806235295855415297', 0, NULL, 'a0ia7r137_202309071055091960', NULL, 0, '2024-12-10 17:09:28', 0, NULL, NULL, NULL, NULL, 1, '', 4, '2024-06-27 15:57:07', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (242, '', '2024-06-27 15:57:09', '', '2024-12-10 17:09:28', NULL, '0', '1806235301656137728', NULL, 3, NULL, '2023.9.7normal', 'a0ia7r137', 'a0ia7r137', '2023-09-07 11:00:20', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806235301660332032', 0, NULL, 'a0ia7r137_202309071057494820', NULL, 0, '2024-12-10 17:09:27', 0, NULL, NULL, NULL, NULL, 1, '', 4, '2024-06-27 15:57:08', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (243, '', '2024-06-27 15:57:26', '', NULL, NULL, '0', '1806235373609422848', NULL, 3, NULL, '可', '902ce60f5', '902ce60f5', '2023-08-02 17:08:21', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806235373613617152', 0, NULL, '902ce60f5_202308021554123060', NULL, 0, NULL, 0, NULL, NULL, NULL, NULL, 1, '', 3, '2024-06-27 15:57:25', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (244, '', '2024-06-27 17:36:42', '', '2024-12-12 20:19:48', NULL, '0', '1806260353562841088', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\916ed6689_202406271627258620', 2, NULL, '1.3.4安卓场景视频135续拍', '916ed6689', '916ed6689', '2024-06-27 17:11:30', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806260353562841089', 0, NULL, '916ed6689_202406271627258620', NULL, 0, NULL, 0, NULL, 'V4', NULL, NULL, 1, '', 3, '2024-12-12 20:19:49', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (245, '', '2024-06-27 17:36:42', '', '2024-12-12 16:27:20', NULL, '0', '1806260353688670208', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\916ed6689_202406271630012760', 2, NULL, '1.3.4安卓场景多楼层135续拍', '916ed6689', '916ed6689', '2024-06-27 17:10:01', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806260353692864512', 0, NULL, '916ed6689_202406271630012760', NULL, 0, NULL, 0, NULL, 'V4', NULL, NULL, 1, '', 3, '2024-12-12 16:27:22', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (246, '', '2024-06-27 17:36:42', '', '2024-12-12 17:53:51', NULL, '0', '1806260353785139200', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\916ed6689_202406271621514800', 2, NULL, '1.3.4&固件1.1.2场景多楼层135续拍', '916ed6689', '916ed6689', '2024-06-27 17:06:54', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806260353785139201', 0, NULL, '916ed6689_202406271621514800', NULL, 0, NULL, 0, NULL, 'V4', NULL, NULL, 1, '', 3, '2024-12-12 17:53:51', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (247, '', '2024-06-27 17:36:42', '', '2024-06-27 18:02:45', NULL, '0', '1806260353873219584', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\916ed6689_202406271558255390', 2, NULL, '1.3.4固件1.1.2场景视频135续拍', '916ed6689', '916ed6689', '2024-06-27 17:06:48', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1806260353873219585', 0, NULL, '916ed6689_202406271558255390', NULL, 0, NULL, 0, NULL, 'V4', NULL, NULL, 1, '', 3, '2024-06-27 18:02:45', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (248, '', '2024-09-19 21:01:19', '', '2024-09-19 21:03:59', NULL, '0', '1836752428859133952', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\b01smr238_202409192059004870\\web_laserData\\laserData', 2, 1, 'Test', 'b01smr238', 'b01smr238', '2024-09-19 21:00:15', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 1, 0, NULL, '1836752428859133953', 0, NULL, 'b01smr238_202409192059004870', NULL, 0, '2024-12-10 16:37:48', 0, NULL, 'V4', NULL, NULL, 1, '', 5, '2024-09-19 21:03:59', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (249, '', '2024-10-09 09:51:10', '', '2024-10-09 10:46:35', NULL, '0', '1843831535858356224', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\b01rnp257_202410090933453650\\web_laserData\\laserData', 2, 2, '项目1009.09.39', 'b01rnp257', 'b01rnp257', '2024-10-09 09:39:57', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 5, 0, NULL, '1843831535858356225', 0, NULL, 'b01rnp257_202410090933453650', NULL, 1, '2024-12-10 16:38:03', 0, NULL, 'V4', NULL, NULL, 1, '', 5, '2024-10-09 10:46:35', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (250, '', '2024-10-09 10:38:10', '', '2024-10-09 11:35:06', NULL, '0', '1843843364802269184', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\b01rnp257_202410091010099510\\web_laserData\\laserData', 2, 1, '项目1009.10.14', 'b01rnp257', 'b01rnp257', '2024-10-09 10:14:50', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1843843364806463488', 0, NULL, 'b01rnp257_202410091010099510', NULL, 1, '2024-12-10 16:38:01', 0, NULL, 'V4', NULL, NULL, 1, '', 5, '2024-10-09 11:35:06', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (251, '', '2024-10-09 10:38:10', '', '2024-10-09 11:19:01', NULL, '0', '1843843364877766656', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\b01rnp257_202410091017147560\\web_laserData\\laserData', 2, 1, '项目1009.10.30', 'b01rnp257', 'b01rnp257', '2024-10-09 10:30:14', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 6, 0, NULL, '1843843364877766657', 0, NULL, 'b01rnp257_202410091017147560', NULL, 1, '2024-12-10 16:37:59', 0, NULL, 'V4', NULL, NULL, 1, '', 5, '2024-10-09 11:19:01', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (252, '', '2024-10-10 13:55:56', '', '2024-12-16 14:46:40', NULL, '0', '1844255524091203584', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\b01rnp257_202410101342568540\\web_laserData\\laserData', 2, 6, '过道', 'b01rnp257', 'b01rnp257', '2024-10-10 13:49:24', 'datav1', NULL, NULL, 'scene_edit_data/1844255524091203584/user/thumb-1k.jpg', '', 1, 0, 'default', NULL, 0, 120, 0, NULL, '1844255524091203585', 2, NULL, 'b01rnp257_202410101342568540', NULL, 1, NULL, 0, NULL, 'V4', 4, 'datav1/1844255524091203584/data/1844255524091203584_offline_.zip', 2, 'zh', 5, '2024-12-13 18:14:57', 4, 0, 0, 7, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (253, '', '2024-10-23 16:04:23', '', '2024-10-23 20:11:22', NULL, '0', '1848998891701932032', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\b01uez231_202410231343139280\\web_laserData\\laserData', 2, 2, '2024.10.23翠湖香山95号被盗案', 'b01uez231', 'b01uez231', '2024-10-23 15:25:29', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 8, 0, NULL, '1848998891706126336', 0, NULL, 'b01uez231_202410231343139280', NULL, 1, '2024-10-24 16:55:38', 0, NULL, 'V4', 2, 'datav1/1848998891701932032/data/1848998891701932032_offline_.zip', 1, 'zh', 5, '2024-10-23 20:11:22', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (254, '', '2024-11-28 16:27:58', '', '2025-01-06 15:35:57', NULL, '0', '1862050788130557952', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\b015ch331_202411281541003780\\web_laserData\\laserData', 2, 4, '项目1128.15.41', 'b015ch331', 'b015ch331', '2024-11-28 15:42:01', 'datav1', NULL, NULL, 'scene_edit_data/1862050788130557952/user/thumb-1k.jpg', '', 1, 0, 'default', NULL, 0, 105, 0, NULL, '1862050788130557953', 3, NULL, 'b015ch331_202411281541003780', NULL, 1, NULL, 0, NULL, 'V4', NULL, NULL, 2, '', 5, '2024-12-13 18:04:04', 4, 0, 0, 11, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (255, '', '2024-12-13 16:18:24', '', '2024-12-13 16:30:33', NULL, '0', '1867484199057887232', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\bpvt00019_202401311045336080\\web_laserData\\laserData', 2, 1, '深光', 'bpvt00019', 'bpvt00019', '2024-01-31 10:52:27', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 2, 0, NULL, '1867484199057887233', 0, NULL, 'bpvt00019_202401311045336080', NULL, 1, NULL, 0, NULL, 'V4', NULL, NULL, 1, '', 5, '2024-12-13 16:30:35', 4, 0, 0, 2, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (256, '', '2024-12-17 10:21:10', '', '2024-12-17 10:26:56', NULL, '0', '1868843848218710016', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\902ce60f5_202412111752518890', 2, NULL, '兼继续', '902ce60f5', '902ce60f5', '2024-12-11 18:26:26', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1868843848218710017', 0, NULL, '902ce60f5_202412111752518890', NULL, 0, NULL, 0, NULL, 'V4', NULL, NULL, 1, '', 3, '2024-12-17 10:26:57', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (257, '', '2024-12-17 17:45:08', '', '2024-12-17 17:50:54', NULL, '0', '1868955577493753856', NULL, 5, NULL, 'slam站点', 'bpvt00019', 'bpvt00019', '2024-12-12 11:14:58', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1868955577493753857', 0, NULL, 'bpvt00019_202412111716064560', NULL, 0, '2024-12-17 17:50:54', 0, NULL, NULL, NULL, NULL, 1, '', 5, '2024-12-17 17:45:07', 6, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (258, '', '2024-12-17 17:46:04', '', '2024-12-17 17:53:05', NULL, '0', '1868955812085370880', NULL, 3, NULL, '纯slam正', 'bpvt00019', 'bpvt00019', '2024-12-10 19:59:16', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1868955812085370881', 0, NULL, 'bpvt00019_202412101958309720', NULL, 0, '2024-12-17 17:53:04', 0, NULL, NULL, NULL, NULL, 1, '', 5, '2024-12-17 17:46:03', 6, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (259, '', '2024-12-17 17:46:04', '', '2024-12-17 17:53:01', NULL, '0', '1868955812232171520', NULL, 3, NULL, 'slam站点正删补', 'bpvt00019', 'bpvt00019', '2024-12-10 20:57:30', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1868955812236365824', 0, NULL, 'bpvt00019_202412101955570240', NULL, 0, '2024-12-17 17:53:00', 0, NULL, NULL, NULL, NULL, 1, '', 5, '2024-12-17 17:46:03', 6, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (260, '', '2024-12-17 17:51:29', '', '2024-12-17 17:52:25', NULL, '0', '1868957178140823552', NULL, 3, NULL, 'slam站点', 'bpvt00019', 'bpvt00019', '2024-12-12 11:14:58', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1868957178145017856', 0, NULL, 'bpvt00019_202412111716064560', NULL, 0, '2024-12-17 17:52:24', 0, NULL, NULL, NULL, NULL, 1, '', 5, '2024-12-17 17:51:29', 6, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (261, '', '2024-12-17 17:53:10', '', '2024-12-17 17:55:12', NULL, '0', '1868957599261528064', NULL, 3, NULL, 'slam站点', 'bpvt00019', 'bpvt00019', '2024-12-12 11:14:58', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1868957599261528065', 0, NULL, 'bpvt00019_202412111716064560', NULL, 0, '2024-12-17 17:55:11', 0, NULL, NULL, NULL, NULL, 1, '', 5, '2024-12-17 17:53:09', 6, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (262, '', '2024-12-17 17:55:28', '', '2024-12-17 17:57:10', NULL, '0', '1868958177433751552', NULL, 3, NULL, 'slam站点', 'bpvt00019', 'bpvt00019', '2024-12-12 11:14:58', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1868958177433751553', 0, NULL, 'bpvt00019_202412111716064560', NULL, 0, '2024-12-17 17:57:09', 0, NULL, NULL, NULL, NULL, 1, '', 5, '2024-12-17 17:55:27', 6, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (263, '', '2024-12-17 17:57:44', '', '2024-12-17 18:05:14', NULL, '0', '1868958660055535616', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\bpvt00019_202412111716064560\\web_laserData\\laserData', 2, 1, 'slam站点', 'bpvt00019', 'bpvt00019', '2024-12-12 11:14:58', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 5, 0, NULL, '1868958660063924224', 0, NULL, 'bpvt00019_202412111716064560', NULL, 0, NULL, 0, NULL, 'V4', NULL, NULL, 1, '', 5, '2024-12-17 18:05:14', 6, 0, 0, 2, 1, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (264, '', '2024-12-17 17:58:16', '', '2024-12-18 11:54:57', NULL, '0', '1868958848648220672', 'D:\\4DMega\\4DKK_PROGRAM_DATA\\bpvt00019_202412111715236170\\web_laserData\\laserData', 2, 1, 'slam', 'bpvt00019', 'bpvt00019', '2024-12-11 17:16:02', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 14, 0, NULL, '1868958848648220673', 2, NULL, 'bpvt00019_202412111715236170', NULL, 0, NULL, 0, NULL, 'V4', NULL, NULL, 2, '', 5, '2024-12-17 18:18:01', 6, 0, 0, 2, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');
INSERT INTO `t_scene` VALUES (265, '', '2025-01-06 16:11:54', '', NULL, NULL, '0', '1876179871223255040', NULL, 3, NULL, '兼上传1', 'bpvt00019', 'bpvt00019', '2024-03-07 16:34:17', 'datav1', NULL, NULL, 'static/img_default/pc.jpg', '', 1, 0, 'default', NULL, 0, 0, 0, NULL, '1876179871223255041', 0, NULL, 'bpvt00019_202403071633116250', NULL, 0, NULL, 0, NULL, NULL, NULL, NULL, 1, '', 5, '2025-01-06 16:11:53', 4, 0, 0, 0, 0, 1, 0, 'profile', 'D:\\4DMega\\4DKK_PROGRAM_STATIC\\');

SET FOREIGN_KEY_CHECKS = 1;
